VERSION 1.0 CLASS
BEGIN
  MultiUse = -1  'True
END
Attribute VB_Name = "Class1"
Attribute VB_GlobalNameSpace = False
Attribute VB_Creatable = False
Attribute VB_PredeclaredId = False
Attribute VB_Exposed = False
Option Explicit

Private Sub Class_Initialize()
    Debug.Print "Application.ScreenUpdating = False"
    Application.ScreenUpdating = False
End Sub

Private Sub Class_Terminate()
    Debug.Print "Application.ScreenUpdating = True"
    Application.ScreenUpdating = True
End Sub
